/*
 Navicat Premium Data Transfer

 Source Server         : MySQL (CIT1)
 Source Server Type    : MySQL
 Source Server Version : 80200 (8.2.0)
 Source Host           : 
 Source Schema         : ry-config

 Target Server Type    : MySQL
 Target Server Version : 80200 (8.2.0)
 File Encoding         : 65001

 Date: 19/02/2024 15:56:16
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for config_info
-- ----------------------------
DROP TABLE IF EXISTS `config_info`;
CREATE TABLE `config_info`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'source ip',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT '租户字段',
  `c_desc` varchar(256) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `c_use` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `effect` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `type` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `c_schema` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL,
  `encrypted_data_key` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL COMMENT '秘钥',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfo_datagrouptenant`(`data_id` ASC, `group_id` ASC, `tenant_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 57 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = 'config_info' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info
-- ----------------------------
INSERT INTO `config_info` VALUES (1, 'application-dev.yml', 'DEFAULT_GROUP', 'spring:\n  autoconfigure:\n    exclude: com.alibaba.druid.spring.boot.autoconfigure.DruidDataSourceAutoConfigure\n  mvc:\n    pathmatch:\n      matching-strategy: ant_path_matcher\n  cloud:\n    # feign 配置\n    openfeign:\n      sentinel:\n        enabled: true\n      okhttp:\n        enabled: true\n      httpclient:\n        enabled: false\n      client:\n        config:\n          default:\n            connectTimeout: 10000\n            readTimeout: 10000\n      compression:\n        request:\n          enabled: true\n          min-request-size: 8192\n        response:\n          enabled: true\n\n# 暴露监控端点\nmanagement:\n  endpoints:\n    web:\n      exposure:\n        include: \'*\'\n', '40039af000c00c2a42c264e926c1d2fc', '2020-05-20 12:00:00', '2024-01-30 08:13:23', NULL, '0:0:0:0:0:0:0:1', '', '', '通用配置', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (2, 'ruoyi-gateway-dev.yml', 'DEFAULT_GROUP', 'spring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n  cloud:\n    gateway:\n      discovery:\n        locator:\n          lowerCaseServiceId: true\n          enabled: true\n      routes:\n        # 认证中心\n        - id: ruoyi-auth\n          uri: lb://ruoyi-auth\n          predicates:\n            - Path=/auth/**\n          filters:\n            # 验证码处理\n            - CacheRequestFilter\n            - ValidateCodeFilter\n            - StripPrefix=1\n        # 代码生成\n        - id: ruoyi-gen\n          uri: lb://ruoyi-gen\n          predicates:\n            - Path=/code/**\n          filters:\n            - StripPrefix=1\n        # 定时任务\n        - id: ruoyi-job\n          uri: lb://ruoyi-job\n          predicates:\n            - Path=/schedule/**\n          filters:\n            - StripPrefix=1\n        # 系统模块\n        - id: ruoyi-system\n          uri: lb://ruoyi-system\n          predicates:\n            - Path=/system/**\n          filters:\n            - StripPrefix=1\n        # 文件服务\n        - id: ruoyi-file\n          uri: lb://ruoyi-file\n          predicates:\n            - Path=/file/**\n          filters:\n            - StripPrefix=1\n        # WMS服务\n        - id: ruoyi-wms\n          uri: lb://ruoyi-wms\n          predicates:\n            - Path=/wms/**\n          filters:\n            - StripPrefix=1\n\n# 安全配置\nsecurity:\n  # 验证码\n  captcha:\n    enabled: true\n    type: math\n  # 防止XSS攻击\n  xss:\n    enabled: true\n    excludeUrls:\n      - /system/notice\n  # 不校验白名单\n  ignore:\n    whites:\n      - /auth/logout\n      - /auth/login\n      - /auth/register\n      - /*/v2/api-docs\n      - /csrf\n      - /auth/specialAuth/login\n      - /system/test/**\n      - /wms/test/**\n', 'f22c229468be457355439a95071c06f2', '2020-05-14 14:17:55', '2024-02-01 08:24:34', NULL, '0:0:0:0:0:0:0:1', '', '', '网关模块', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (3, 'ruoyi-auth-dev.yml', 'DEFAULT_GROUP', 'spring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n\nspecial:\n  auth:\n    login-enabled: true\n', '15384b16790e69bd4bf31109a6aea12b', '2020-11-20 00:00:00', '2024-02-01 08:23:56', NULL, '0:0:0:0:0:0:0:1', '', '', '认证中心', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (4, 'ruoyi-monitor-dev.yml', 'DEFAULT_GROUP', '# spring\nspring:\n  security:\n    user:\n      name: ryas\n      password: [REDACTED]  boot:\n    admin:\n      ui:\n        title: RYAS服务状态监控\n', '8b3ccaa35d17b5abe8c05a66a264e5f5', '2020-11-20 00:00:00', '2024-01-31 07:28:14', NULL, '0:0:0:0:0:0:0:1', '', '', '监控中心', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (5, 'ruoyi-system-dev.yml', 'DEFAULT_GROUP', '# spring配置\nspring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        connectTimeout: 30000\n        socketTimeout: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          # 主库数据源\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://localhost:3306/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: root\n            password: [REDACTED]          # 从库数据源\n          # slave:\n            # username: \n            # password: \n            # url: \n            # driver-class-name: \n\n# mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.ruoyi.system\n    # 配置MyBatis日志输出\n    configuration:\n      log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\n\n# swagger配置\nswagger:\n  title: 系统模块接口文档\n  license: Powered By ruoyi\n  licenseUrl: https://ruoyi.vip\n', 'c16551d84032495e08b4d0a23648258b', '2020-11-20 00:00:00', '2024-02-01 07:46:29', NULL, '0:0:0:0:0:0:0:1', '', '', '系统模块', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (6, 'ruoyi-gen-dev.yml', 'DEFAULT_GROUP', '# spring配置\nspring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n  datasource:\n    driver-class-name: com.mysql.cj.jdbc.Driver\n    url: jdbc:mysql://localhost:3306/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n    username: root\n    password: [REDACTED] mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.ruoyi.gen.domain\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\n    mapperLocations: classpath:mapper/**/*.xml\n\n# swagger配置\nswagger:\n  title: 代码生成接口文档\n  license: Powered By ruoyi\n  licenseUrl: https://ruoyi.vip\n\n# 代码生成\ngen:\n  # 作者\n  author: ryas\n  # 默认生成包路径 system 需改成自己的模块名称 如 system monitor tool\n  packageName: com.ruoyi.system\n  # 自动去除表前缀，默认是false\n  autoRemovePre: false\n  # 表前缀（生成类名不会包含表前缀，多个用逗号分隔）\n  tablePrefix: sys_\n', '6a608ec04c64588783a08316dbe2ac3e', '2020-11-20 00:00:00', '2024-02-05 08:56:27', 'alan', '101.229.149.67', '', '', '代码生成', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (7, 'ruoyi-job-dev.yml', 'DEFAULT_GROUP', '# spring配置\nspring:\n  redis:\n    host: localhost\n    port: 6379\n    password: \n  datasource:\n    driver-class-name: com.mysql.cj.jdbc.Driver\n    url: jdbc:mysql://localhost:3306/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n    username: root\n    password: [REDACTED] mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.ruoyi.job.domain\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\n    #mapperLocations: classpath:mapper/**/*.xml\n\n# swagger配置\nswagger:\n  title: 定时任务接口文档\n  license: Powered By ruoyi\n  licenseUrl: https://ruoyi.vip\n', '79c2abe7b92b996eae686e4e158efa89', '2020-11-20 00:00:00', '2024-01-31 09:04:48', NULL, '0:0:0:0:0:0:0:1', '', '', '定时任务', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (8, 'ruoyi-file-dev.yml', 'DEFAULT_GROUP', '# 本地文件上传    \nfile:\n    domain: http://127.0.0.1:9300\n    path: D:/temp/ruoyi/uploadPath\n    prefix: /statics\n\n# FastDFS配置\nfdfs:\n  domain: http://8.129.231.12\n  soTimeout: 3000\n  connectTimeout: 2000\n  trackerList: 8.129.231.12:22122\n\n# Minio配置\nminio:\n  url: http://8.129.231.12:9000\n  accessKey: minioadmin\n  secretKey: minioadmin\n  bucketName: test\n\n# spring配置\nspring:\n  datasource:\n    druid:\n    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        connectTimeout: 30000\n        socketTimeout: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          # 主库数据源\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://localhost:3306/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: root\n            password: [REDACTED]          # 从库数据源\n          # slave:\n            # username: \n            # password: \n            # url: \n            # driver-class-name: \n\n# mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.ruoyi.file\n    # 配置MyBatis日志输出\n    configuration:\n      log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\n', '558d0a9349f5560d8f0bffc3c0c36eab', '2020-11-20 00:00:00', '2024-02-19 07:22:11', 'alan', '101.229.149.67', '', '', '文件服务', 'null', 'null', 'yaml', '', '');
INSERT INTO `config_info` VALUES (9, 'sentinel-ruoyi-gateway', 'DEFAULT_GROUP', '[\r\n    {\r\n        \"resource\": \"ruoyi-auth\",\r\n        \"count\": 500,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    },\r\n	{\r\n        \"resource\": \"ruoyi-system\",\r\n        \"count\": 1000,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    },\r\n	{\r\n        \"resource\": \"ruoyi-gen\",\r\n        \"count\": 200,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    },\r\n	{\r\n        \"resource\": \"ruoyi-job\",\r\n        \"count\": 300,\r\n        \"grade\": 1,\r\n        \"limitApp\": \"default\",\r\n        \"strategy\": 0,\r\n        \"controlBehavior\": 0\r\n    }\r\n]', '9f3a3069261598f74220bc47958ec252', '2020-11-20 00:00:00', '2020-11-20 00:00:00', NULL, '0:0:0:0:0:0:0:1', '', '', '限流策略', 'null', 'null', 'json', NULL, '');
INSERT INTO `config_info` VALUES (35, 'ruoyi-gateway-dev.yml', 'GROUP_ALL_IN_1', 'spring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n  cloud:\n    gateway:\n      discovery:\n        locator:\n          lowerCaseServiceId: true\n          enabled: true\n      routes:\n        # 认证中心\n        - id: ruoyi-auth\n          uri: lb://ruoyi-system\n          predicates:\n            - Path=/auth/**\n          filters:\n            # 验证码处理\n            - CacheRequestFilter\n            - ValidateCodeFilter\n            - StripPrefix=1\n        # 代码生成\n        - id: ruoyi-gen\n          uri: lb://ruoyi-gen\n          predicates:\n            - Path=/code/**\n          filters:\n            - StripPrefix=1\n        # 定时任务\n        - id: ruoyi-job\n          uri: lb://ruoyi-system\n          predicates:\n            - Path=/schedule/**\n          filters:\n            - StripPrefix=1\n        # 系统模块\n        - id: ruoyi-system\n          uri: lb://ruoyi-system\n          predicates:\n            - Path=/system/**\n          filters:\n            - StripPrefix=1\n        # 文件服务\n        - id: ruoyi-file\n          uri: lb://ruoyi-system\n          predicates:\n            - Path=/file/**\n          filters:\n            - StripPrefix=1\n        # WMS服务\n        - id: ruoyi-wms\n          uri: lb://ruoyi-wms\n          predicates:\n            - Path=/wms/**\n          filters:\n            - StripPrefix=1\n\n# 安全配置\nsecurity:\n  # 验证码\n  captcha:\n    enabled: true\n    type: math\n  # 防止XSS攻击\n  xss:\n    enabled: true\n    excludeUrls:\n      - /system/notice\n  # 不校验白名单\n  ignore:\n    whites:\n      - /auth/logout\n      - /auth/login\n      - /auth/register\n      - /*/v2/api-docs\n      - /csrf\n      - /auth/specialAuth/login\n      - /system/test/**\n      - /wms/test/**\n', 'cc74a6d0d4b40c085da48f56fbd01e5b', '2024-01-31 09:34:00', '2024-02-01 08:25:17', NULL, '0:0:0:0:0:0:0:1', '', '', '', '', '', 'yaml', '', '');
INSERT INTO `config_info` VALUES (36, 'ruoyi-system-dev.yml', 'GROUP_ALL_IN_1', '# spring配置\nspring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        connectTimeout: 30000\n        socketTimeout: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          # 主库数据源\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://localhost:3306/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: root\n            password: [REDACTED]          # 从库数据源\n          # slave:\n            # username: \n            # password: \n            # url: \n            # driver-class-name: \n\n# mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.ruoyi.system,com.ruoyi.job.domain\n    # 配置MyBatis日志输出\n    configuration:\n      log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\n\n# 本地文件上传    \nfile:\n    domain: http://127.0.0.1:9201\n    path: D:/temp/ruoyi/uploadPath\n    prefix: /statics\n\n# FastDFS配置\nfdfs:\n  domain: http://8.129.231.12\n  soTimeout: 3000\n  connectTimeout: 2000\n  trackerList: 8.129.231.12:22122\n\n# Minio配置\nminio:\n  url: http://8.129.231.12:9000\n  accessKey: minioadmin\n  secretKey: minioadmin\n  bucketName: test\n\n# 特殊登录控制（不需要验证码）\nspecial:\n  auth:\n    login-enabled: true\n', '79e0d26257e644b6a248990af323f59d', '2024-01-31 09:34:19', '2024-02-01 08:28:49', NULL, '0:0:0:0:0:0:0:1', '', '', '', '', '', 'yaml', '', '');
INSERT INTO `config_info` VALUES (37, 'application-dev.yml', 'GROUP_ALL_IN_1', 'spring:\n  autoconfigure:\n    exclude: com.alibaba.druid.spring.boot.autoconfigure.DruidDataSourceAutoConfigure\n  mvc:\n    pathmatch:\n      matching-strategy: ant_path_matcher\n  cloud:\n    # feign 配置\n    openfeign:\n      sentinel:\n        enabled: true\n      okhttp:\n        enabled: true\n      httpclient:\n        enabled: false\n      client:\n        config:\n          default:\n            connectTimeout: 10000\n            readTimeout: 10000\n      compression:\n        request:\n          enabled: true\n          min-request-size: 8192\n        response:\n          enabled: true\n\n# 暴露监控端点\nmanagement:\n  endpoints:\n    web:\n      exposure:\n        include: \'*\'\n', '40039af000c00c2a42c264e926c1d2fc', '2024-01-31 09:37:04', '2024-01-31 09:37:04', NULL, '0:0:0:0:0:0:0:1', '', '', '通用配置', NULL, NULL, 'yaml', NULL, '');
INSERT INTO `config_info` VALUES (38, 'ruoyi-monitor-dev.yml', 'GROUP_ALL_IN_1', '# spring\nspring:\n  security:\n    user:\n      name: ryas\n      password: [REDACTED]  boot:\n    admin:\n      ui:\n        title: RYAS服务状态监控\n', '8b3ccaa35d17b5abe8c05a66a264e5f5', '2024-01-31 09:37:29', '2024-01-31 09:37:29', NULL, '0:0:0:0:0:0:0:1', '', '', '监控中心', NULL, NULL, 'yaml', NULL, '');
INSERT INTO `config_info` VALUES (39, 'ruoyi-gen-dev.yml', 'GROUP_ALL_IN_1', '# spring配置\nspring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n  datasource:\n    driver-class-name: com.mysql.cj.jdbc.Driver\n    url: jdbc:mysql://localhost:3306/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n    username: root\n    password: [REDACTED] mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.ruoyi.gen.domain\n    # 配置mapper的扫描，找到所有的mapper.xml映射文件\n    mapperLocations: classpath:mapper/**/*.xml\n\n# swagger配置\nswagger:\n  title: 代码生成接口文档\n  license: Powered By ruoyi\n  licenseUrl: https://ruoyi.vip\n\n# 代码生成\ngen:\n  # 作者\n  author: ryas\n  # 默认生成包路径 system 需改成自己的模块名称 如 system monitor tool\n  packageName: com.ruoyi.system\n  # 自动去除表前缀，默认是false\n  autoRemovePre: false\n  # 表前缀（生成类名不会包含表前缀，多个用逗号分隔）\n  tablePrefix: sys_\n', '6a608ec04c64588783a08316dbe2ac3e', '2024-01-31 09:37:29', '2024-02-05 08:56:38', 'alan', '101.229.149.67', '', '', '代码生成', '', '', 'yaml', '', '');
INSERT INTO `config_info` VALUES (45, 'ruoyi-wms-dev.yml', 'DEFAULT_GROUP', '# spring配置\nspring:\n  redis:\n    host: localhost\n    port: 6379\n    password:\n  datasource:\n    druid:\n      stat-view-servlet:\n        enabled: true\n        loginUsername: admin\n        loginPassword: [REDACTED]    dynamic:\n      druid:\n        initial-size: 5\n        min-idle: 5\n        maxActive: 20\n        maxWait: 60000\n        connectTimeout: 30000\n        socketTimeout: 60000\n        timeBetweenEvictionRunsMillis: 60000\n        minEvictableIdleTimeMillis: 300000\n        validationQuery: SELECT 1 FROM DUAL\n        testWhileIdle: true\n        testOnBorrow: false\n        testOnReturn: false\n        poolPreparedStatements: true\n        maxPoolPreparedStatementPerConnectionSize: 20\n        filters: stat,slf4j\n        connectionProperties: druid.stat.mergeSql\\=true;druid.stat.slowSqlMillis\\=5000\n      datasource:\n          # 主库数据源\n          master:\n            driver-class-name: com.mysql.cj.jdbc.Driver\n            url: jdbc:mysql://localhost:3306/ry-cloud?useUnicode=true&characterEncoding=utf8&zeroDateTimeBehavior=convertToNull&useSSL=true&serverTimezone=GMT%2B8\n            username: root\n            password: [REDACTED]          # 从库数据源\n          # slave:\n            # username: \n            # password: \n            # url: \n            # driver-class-name: \n\n# mybatis配置\nmybatis:\n    # 搜索指定包别名\n    typeAliasesPackage: com.ruoyi.wms.domain\n    # 配置MyBatis日志输出\n    configuration:\n      log-impl: org.apache.ibatis.logging.stdout.StdOutImpl\n', '33fd0757ceb0a95e7fa62bf1646121cd', '2024-02-01 07:44:47', '2024-02-01 07:45:50', NULL, '0:0:0:0:0:0:0:1', '', '', '系统模块', '', '', 'yaml', '', '');

-- ----------------------------
-- Table structure for config_info_aggr
-- ----------------------------
DROP TABLE IF EXISTS `config_info_aggr`;
CREATE TABLE `config_info_aggr`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `datum_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'datum_id',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT '内容',
  `gmt_modified` datetime NOT NULL COMMENT '修改时间',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT '租户字段',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfoaggr_datagrouptenantdatum`(`data_id` ASC, `group_id` ASC, `tenant_id` ASC, `datum_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = '增加租户字段' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info_aggr
-- ----------------------------

-- ----------------------------
-- Table structure for config_info_beta
-- ----------------------------
DROP TABLE IF EXISTS `config_info_beta`;
CREATE TABLE `config_info_beta`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'content',
  `beta_ips` varchar(1024) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'betaIps',
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'source ip',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT '租户字段',
  `encrypted_data_key` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL COMMENT '秘钥',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfobeta_datagrouptenant`(`data_id` ASC, `group_id` ASC, `tenant_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = 'config_info_beta' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info_beta
-- ----------------------------

-- ----------------------------
-- Table structure for config_info_tag
-- ----------------------------
DROP TABLE IF EXISTS `config_info_tag`;
CREATE TABLE `config_info_tag`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `tag_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'tag_id',
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'content',
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'md5',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL COMMENT 'source user',
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'source ip',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_configinfotag_datagrouptenanttag`(`data_id` ASC, `group_id` ASC, `tenant_id` ASC, `tag_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = 'config_info_tag' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_info_tag
-- ----------------------------

-- ----------------------------
-- Table structure for config_tags_relation
-- ----------------------------
DROP TABLE IF EXISTS `config_tags_relation`;
CREATE TABLE `config_tags_relation`  (
  `id` bigint NOT NULL COMMENT 'id',
  `tag_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'tag_name',
  `tag_type` varchar(64) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'tag_type',
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'data_id',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'group_id',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `nid` bigint NOT NULL AUTO_INCREMENT,
  PRIMARY KEY (`nid`) USING BTREE,
  UNIQUE INDEX `uk_configtagrelation_configidtag`(`id` ASC, `tag_name` ASC, `tag_type` ASC) USING BTREE,
  INDEX `idx_tenant_id`(`tenant_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = 'config_tag_relation' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of config_tags_relation
-- ----------------------------

-- ----------------------------
-- Table structure for group_capacity
-- ----------------------------
DROP TABLE IF EXISTS `group_capacity`;
CREATE TABLE `group_capacity`  (
  `id` bigint UNSIGNED NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL DEFAULT '' COMMENT 'Group ID，空字符表示整个集群',
  `quota` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '配额，0表示使用默认值',
  `usage` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '使用量',
  `max_size` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '聚合子配置最大个数，，0表示使用默认值',
  `max_aggr_size` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '最大变更历史数量',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_group_id`(`group_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = '集群、各Group容量信息表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of group_capacity
-- ----------------------------

-- ----------------------------
-- Table structure for his_config_info
-- ----------------------------
DROP TABLE IF EXISTS `his_config_info`;
CREATE TABLE `his_config_info`  (
  `id` bigint UNSIGNED NOT NULL,
  `nid` bigint UNSIGNED NOT NULL AUTO_INCREMENT,
  `data_id` varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL,
  `group_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL,
  `app_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'app_name',
  `content` longtext CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL,
  `md5` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
  `src_user` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL,
  `src_ip` varchar(50) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `op_type` char(10) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL,
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT '租户字段',
  `encrypted_data_key` text CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL COMMENT '秘钥',
  PRIMARY KEY (`nid`) USING BTREE,
  INDEX `idx_gmt_create`(`gmt_create` ASC) USING BTREE,
  INDEX `idx_gmt_modified`(`gmt_modified` ASC) USING BTREE,
  INDEX `idx_did`(`data_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 54 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = '多租户改造' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of his_config_info
-- ----------------------------

-- ----------------------------
-- Table structure for permissions
-- ----------------------------
DROP TABLE IF EXISTS `permissions`;
CREATE TABLE `permissions`  (
  `role` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `resource` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `action` varchar(8) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  UNIQUE INDEX `uk_role_permission`(`role` ASC, `resource` ASC, `action` ASC) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of permissions
-- ----------------------------

-- ----------------------------
-- Table structure for roles
-- ----------------------------
DROP TABLE IF EXISTS `roles`;
CREATE TABLE `roles`  (
  `username` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `role` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  UNIQUE INDEX `idx_user_role`(`username` ASC, `role` ASC) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of roles
-- ----------------------------
INSERT INTO `roles` VALUES ('alan', 'ROLE_ADMIN');

-- ----------------------------
-- Table structure for tenant_capacity
-- ----------------------------
DROP TABLE IF EXISTS `tenant_capacity`;
CREATE TABLE `tenant_capacity`  (
  `id` bigint UNSIGNED NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL DEFAULT '' COMMENT 'Tenant ID',
  `quota` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '配额，0表示使用默认值',
  `usage` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '使用量',
  `max_size` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个配置大小上限，单位为字节，0表示使用默认值',
  `max_aggr_count` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '聚合子配置最大个数',
  `max_aggr_size` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '单个聚合数据的子配置大小上限，单位为字节，0表示使用默认值',
  `max_history_count` int UNSIGNED NOT NULL DEFAULT 0 COMMENT '最大变更历史数量',
  `gmt_create` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `gmt_modified` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_tenant_id`(`tenant_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = '租户容量信息表' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tenant_capacity
-- ----------------------------

-- ----------------------------
-- Table structure for tenant_info
-- ----------------------------
DROP TABLE IF EXISTS `tenant_info`;
CREATE TABLE `tenant_info`  (
  `id` bigint NOT NULL AUTO_INCREMENT COMMENT 'id',
  `kp` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NOT NULL COMMENT 'kp',
  `tenant_id` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT 'tenant_id',
  `tenant_name` varchar(128) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT '' COMMENT 'tenant_name',
  `tenant_desc` varchar(256) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'tenant_desc',
  `create_source` varchar(32) CHARACTER SET utf8mb3 COLLATE utf8mb3_bin NULL DEFAULT NULL COMMENT 'create_source',
  `gmt_create` bigint NOT NULL COMMENT '创建时间',
  `gmt_modified` bigint NOT NULL COMMENT '修改时间',
  PRIMARY KEY (`id`) USING BTREE,
  UNIQUE INDEX `uk_tenant_info_kptenantid`(`kp` ASC, `tenant_id` ASC) USING BTREE,
  INDEX `idx_tenant_id`(`tenant_id` ASC) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 2 CHARACTER SET = utf8mb3 COLLATE = utf8mb3_bin COMMENT = 'tenant_info' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tenant_info
-- ----------------------------

-- ----------------------------
-- Table structure for users
-- ----------------------------
DROP TABLE IF EXISTS `users`;
CREATE TABLE `users`  (
  `username` varchar(50) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `password` varchar(500) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `enabled` tinyint(1) NOT NULL,
  PRIMARY KEY (`username`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of users
-- ----------------------------
INSERT INTO `users` VALUES ('alan', '$2a$10$/Sqe163WdMEnL.gyVu7v..tVSThUMiy7Wec37eLGByuT.UY7pbm6a', 1);

SET FOREIGN_KEY_CHECKS = 1;
