CREATE TABLE IF NOT EXISTS `en_word_phrase` (
    `id` BIGINT PRIMARY KEY AUTO_INCREMENT COMMENT '短语记录主键ID',
    `word_id` BIGINT NOT NULL COMMENT '单词ID，关联 en_word.id',
    `phrase_en` VARCHAR(200) NOT NULL COMMENT '英文短语',
    `phrase_cn` VARCHAR(200) COMMENT '中文释义'
    `delete_flag` TINYINT(1) DEFAULT 0 COMMENT '删除标志，0-正常，1-删除',
    `create_at` DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `update_at` DATETIME DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='英语单词短语表';
