CREATE TABLE IF NOT EXISTS `en_word_pron` (
    `id` BIGINT PRIMARY KEY AUTO_INCREMENT COMMENT '发音记录主键ID',
    `word_id` BIGINT NOT NULL COMMENT '单词ID，关联 en_word.id',
    `uk_phone` VARCHAR(100) COMMENT '英式音标',
    `us_phone` VARCHAR(100) COMMENT '美式音标',
    `uk_speech` VARCHAR(200) COMMENT '英式发音资源地址或参数',
    `us_speech` VARCHAR(200) COMMENT '美式发音资源地址或参数',
    `delete_flag` TINYINT(1) DEFAULT 0 COMMENT '删除标志，0-正常，1-删除',
    `create_at` DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `update_at` DATETIME DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间'
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_unicode_ci COMMENT='英语单词发音表';
